; HSI_MicroVu.def : Declares the module parameters for the DLL.

LIBRARY      "HSI_MicroVu.DLL"
; DESCRIPTION  'HSI_MicroVu Windows Dynamic Link Library'  // rk 040809

EXPORTS
    ; Explicit exports can go here
