EXPORTS
    usb_open
    usb_close
    usb_get_string
    usb_get_string_simple
    usb_get_descriptor_by_endpoint
    usb_get_descriptor
    usb_bulk_write
    usb_bulk_read
    usb_interrupt_write
    usb_interrupt_read
    usb_control_msg
    usb_set_configuration
    usb_claim_interface
    usb_release_interface
    usb_set_altinterface
    usb_resetep
    usb_clear_halt
    usb_reset
    usb_strerror
    usb_init
    usb_set_debug
    usb_find_busses
    usb_find_devices
    usb_device
    usb_get_busses
    usb_install_service_np
    usb_install_service_np_rundll
    usb_uninstall_service_np
    usb_uninstall_service_np_rundll
    usb_install_driver_np
    usb_install_driver_np_rundll
    usb_touch_inf_file_np
    usb_touch_inf_file_np_rundll
    usb_get_version
    usb_isochronous_setup_async
    usb_bulk_setup_async
    usb_interrupt_setup_async
    usb_submit_async
    usb_reap_async
    usb_reap_async_nocancel
    usb_cancel_async
    usb_free_async  
    usb_install_needs_restart_np
    usb_install_npW
    usb_install_npA
    usb_install_np_rundll



